1 Help
 This is the CMS Library Editor.  It is intended to help make quick lookups
 of Library elements easier.

1 Invocation
 The LIBED command has the following format:
 $ LIBED [/qualifiers] [element-specification[/qualifiers],...]

2 Parameters
 element-specification
  This may be any valid element specification or group name.  Wildcards are
  permitted.  By default, LIBED used *.* as the element specification.  Up
  to ten elements spec's may be used.

/LIBRARY
 The /LIBRARY qualifier may be placed immediately following the command,
 or after element-specifications.  By default, your current CMS Library
 (if set) is used.

/GENERATION
 The /GENERATION qualifier allows you to specify a specific class or 
 generation of the element(s) you wish to look at.  By default, the latest
 generation (1+) is the generation used.

1 Cursor_motion
 Simply press the arrow keys to move about the display on the screen.  To
 move to a different display, press the "0" key on the keypad.

1 Exit
 Press ^Z to leave LIBED.

1 Refresh
 Press ^W to refresh the display.

1 View
 Press "V" (or "v") to look at the contents of an element.

1 Zoom
 Press "Z" (or "z") to "zoom" in on the attributes of a particular generation
 of an element.  Press any key to return to the element menu.


