!***START
!	VAXUSE
!
!	J. Thompson  Intermetrics  November 21, 1978
!
	This program uses as input a report file generated by the accounting
	program ACC1 to produce a summary report of system use by each user
	that reflects a weighting of "raw" values for terminal connect time,
	cpu sec, diskspace.  The weighted values when summed produce "Resource
	Units" for each user.  A constant factor times RU's gives "System
	Units" (or dollars to be billed if so desired).

	The user will of course choose his own weighting factors.  He also
	must supply input and output filenames.
!***END
