!***START
!
!	WANGUSE.HLP
!
!	AUTHOR:  J. THOMPSON  INTERMETRICS
!
!	DATE:    19 MARCH 1979
!
!	MODULES:	TOVAX.FOR, FROMVAX.FOR, WAITABIT.FOR
!
!	PROGRAM GENERATION:	FOR TOVAX
!				FOR FROMVAX
!				FOR WAITABIT
!
!				LINK TOVAX,WAITABIT
!				LINK FROMVAX,WAITABIT
!
!	PROGRAM INSTALLATION:	TOVAX.EXE, FROMVAX.EXE SHOULD BE PLACED
!				IN SYS$SYSTEM AND WANGUSE.HLP SHOULD BE
!				PUT IN THE APPROPRIATE [SYSHLP] FILES.
!
!				THE SYSTEM MANAGER SHOULD MAKE THE FOLLOWING
!				ENTRIES IN LOGSYS.COM:
!
!				$TOVAX:==RUN SYS$SYSTEM:TOVAX
!				$FROMVAX:==RUN SYS$SYSTEM:FROMVAX
!
!
!				THE SYSTEM MANAGER SHOULD MAKE THE FOLLOWING
!				ENTRY IN [SYSMGR]SYSTARTUP.COM
!
!	$SET TERM TTxn: /LA36/TAB/WIDTH=80/PAGE=14/CRF=9/LFF=9/SPEED=1200/PERM
!
!	CONNECT THE WANG TO TERMINAL PORT TTxn
!
!	IT IS IMPORTANT THAT THE WANG TERMINAL NOT BE USED FOR COMMUNICATION
!	AT A SPEED GREATER THAN 1200 BAUD SINCE IT CANNOT KEEP UP WITH THE
!	VAX ABOVE 1200 BAUD.
!


	WANG Word processor Communication with the VAX

	-------------------------------------------------------------------

(1)	Select the Telecommunications option on the WANG
	Schedule the Telecommunication session
	Use the connection option that is called   tty
	Set the line speed to 1200 on the WANG
	Set the FORMAT for TABs in columns 9, 17, 25, etc.
	Now you can type RETURN and log onto the VAX as if the WANG
	were an ordinary terminal.
	(One problem:  PASSWORD is echoed)
 *** 	DON'T FORGET TO LOGOFF WHEN YOU ARE DONE!
	-----------------------------------------------------------------

(2)	TO SEND to the VAX, type TOVAX
	Tell the VAX what you want to call the filename on the VAX
	Press the START DOC SEND button.  Tell the WANG the Send Doc ID.
	Press the EXECUTE button
	When you get the Doc Name OK? prompt, press the EXECUTE button again.
	When the echoing of the transmission on the screen stops, type an
	alternating sequence of two characters for a total of at least 
	6 characters followed by RETURN.  Start the sequence in column 1.
	This stops the TOVAX program.  For example mnmnmn  or 565656.
	You can interrupt the transmission by pressing the STOP DOC SEND
	button.  Then type an alternating character stop sequence to stop
	the TOVAX program.
	The transmission is complete.
	------------------------------------------------------------------

(3)	TO RECEIVE a file from the VAX, type FROMVAX
	Tell the VAX what the file name is on the VAX
	The FROMVAX program warns you that you have xx seconds to prepare
	for document reception.
	Press the RECV TO  DOC button.  Tell the WANG the filename.
	Hit the EXECUTE button.
	When the *** message from FROMVAX appears, hit the CLOSE RECV DOC
	button.
	The transmission is complete.

 ***	The WANG may occasionally drop a character when set for 1200
	baud.  If you are concerned about this, perform the following
	VAX command:  SET TERM/SPEED=600
	Then, set the WANG speed to 600 baud.
	------------------------------------------------------------------

 *****	  DON'T USE THE WANG AS A TERMINAL FOR ANYTHING BUT
 *****	  SENDING FILES BACK AND FORTH USING THE FOLLOWING
 *****	  TWO COMMUNICATIONS PROGRAMS:  TOVAX.EXE, FROMVAX.EXE
 *****	  THE REASON IS THAT THE WANG USES HALF DUPLEX PROTOCOL AND
 *****	  ONE CANNOT INTERRUPT CHARACTERS TYPING TO THE SCREEN FROM
 *****	  THE VAX WITH THE USUAL CONTROL CHARACTERS. (N.B. ANY CONTROL
 *****	  CHARACTER TO THE VAX, WHEN YOU CAN SEND SUCH CHARACTERS, MUST
 *****	  BE ENTERED WITH THE CONTROL-SHIFT-CHARACTER SEQUENCE.) 
 *****	  FREQUENTLY, TYPING TOO RAPIDLY WILL CAUSE CHARACTERS TO BE
 *****	  DROPPED.  ALSO, WHILE THE WANG IS TRANSMITTING OR RECEIVING,
 *****	  THE KEYBOARD IS LOCKED AND YOU CANNOT INTERRUPT THE PROCESS.
!
!***END
