			DISPLAYDM.HLP
			Paul Sears
			Woods Hole Oceanographic Institution

	DISPLAYDM is a modification of the standard VAX/VMS DISPLAY.EXE 
patched to run on a DATAMEDIA ELITE 3000 vidio terminal. The problem
with the 3000 is that it doesn't accept the standard VT52/55/100 escape
sequence to enter "graphics" mode and draw full squares. Those characters
were patched out of the core image. There are still some incompatabilities
regarding cursor position sending, but the program will do the bar graphs
(T,S2,M2) for performance evalutation.
