
1 RESEQUENCE
 Resequence labels, by program unit, of VAX-11 compatible FORTRAN  code.
 More  than  one  program  unit may be resequenced at once, however, all
 units must reside in one file.

 Format:

         RESEQUENCE [file-spec]

2 Parameters
file-spec
 Specifies name of FORTRAN source file to be  resequenced.   Resequenced
 code  is  written  to  a new version under the same file name.  Default
 file extension is "FOR".

2 Qualifiers
/INCREMENT[=n] (D=20)
 Incremental difference to be used in generating new labels.  This qual-
 ifier has a maximum value of 99 and must be greater than zero.
/FORMAT_LABEL[=n]
 Starting label at which "FORMAT" statements are to begin in  each  pro-
 gram  unit.  Must be decimal integer having value less than 50001.  The
 value must be large enough so as to not interfere with the labeling  of
 other FORTRAN statements.  A recommended usage would be:

                /FORMAT_LABEL=8000

