1 WIDTH

This command will set your VT100 to 80 or 132 column
mode.  The format of the command is a follows:

                WID[TH] [n]
        or
                WID[TH] H[ELP]

where n is the mode to which the VT100 is to be switched.
If n is not specified and your terminal is currently in
the 80 column mode, it will change to 132 and vice versa.

Examples:    command      mode (after command)
             -------      ----
             (initial)     80
             WIDTH 80      80
             WIDTH 132    132
             WID 80        80
             WID          132
             WID           80
