1	VPR
No Help available yet
2	REFERENCE_CODE
Each problem report is assigned a reference code number which may be used
to later retrieve information about the status/resolution of the problem.
2	USER
The name should be a valid VAX user name.
2	COMPONENT
The VMS component the problem relates to is entered here.  It is used
for later retrieval of all problem reports relating to that particular
component/subject.
2	SUBMIT_DATE
The date the problem report was submitted in the form DD-MM-YY.
2	ANSWER_DATE
The date the problem report was resolved in the form DD-MM-YY.
2	DISPOSITION
A problem report may exist in three states, OPEN, CLOSED and SPR_SENT.
If the report is OPEN, it has been submitted by a user, and is being worked
or or soon will be.  If it CLOSED, no further work is being done on the
problem.  Presumably, an answer for the problem has been sent back to the
initiating user.  If the VPR is marked with SPR_SENT, a SPR report was sent
in to DEC. When DEC returns the SPR answer, the VPR will be marked close,
and the VPR answer referenced to the SPR answer.
2	SPR_FILE
If an SPR is sent, this field has the company internal number of the SPR.
It may be used for tracking the SPR and eventually reading DEC's answer.
2	ABSTRACT
A one line description of the problem.
