1	Mail_Message
	Mail_Message   is designed to allow command procedures to find
	out how many unread VAXmail messages are left unread.  It is designed
	to be used as a foreign command.

		M:=$SYS$VPWFILES:MAILMSG

	The command format is   M <Username>   where <Username> is the
	User_name used for specifying the account file.  Mail_Msg
	reads the number of unread mail messages from the account file
	and set that value in the global symbol MAIL_MSG_NUMBER.

	For general use Mail_Message must either only be used by those 
	with SYSPRV or it must be installed so that it has read access
	rights for SYS$SYSTEM:VMSMAIL.DAT.  
