1	Type_Page

	Type_Page is a foreign command which will type out a section
	of an ASCII sequential file.  The format of the command is
	
	TYPE_PAGE <filename>/Start=xxx/End=zzz

	Starting with line 'xxx' in the file, the file contents up to
	and including line 'zzz' will be displayed.
	

	Type_Page sources are located on the VPW maintenance account.
