1 Conference_Room
Invokes the conference room reservation program,  which enables you to
reserve time  on any of the available VAX terminals.  The basic reservable
unit for the program is a half-hour slot. 

The program is fully menu-driven and HELP is available from each menu.
It may only be used on a VT100/VT200 compatible terminal. The only
other point worthy of mention is that all times used by the program are in
24-hour format. 

FORMAT:

		$RESERVE_ROOM:==$SYS$SYSVPWFILES:CONFROOM

The conference room reservation program can be accessed from the VPW and
VOS workstation data-base menu. 
