DATE   -   Allows setting of default date for all SHOW options and shows 
	   free rooms for each selected date & time.  Prompts for date (defaults
	   to current date"  Next prompts for time.  After time entered, shows
	   all rooms having the given time slot open and prompts for one to
	   select either Next_TIME or Previous_Time.  The NEXT and PREVIOUS
	   commands which can be accessed by the Mini-Keypad Prev/Next keys,
	   moves the check time 30 minutes each time.

LOCATION - Shows all reservations on a given day and in a given conference 
	   room.  Prompts to see if you want a list of available rooms.  Next
	   asks if you want to see a list of available rooms.  If 'Y' displays 
	   the list.  For both cases it then promps for the Room ID (i.e.
	   (RM01, RM02...).  If room exists, it prompts for the date to 
	   display entries for.  The entire day's reservations are then
	   displayed.  The Previous and Next command can now be used to	
	   check the reservation list over a range of days.
  
NAMES    - Lists all existing room ID;s. 
 
OWN      - Lists all reservations made for a given day for the user. 
