1 MCL
 Multi-Column Lister

  The Multi-Column Lister will copy an ASCII file  into  a  file  having
  multiple  columns,  if  possible.   As  many  as  nine columns will be
  written on one page with a vertical line separating the columns.   The
  output  file  name  gets  a default file type of .MCL if not otherwise
  specified.  Imbedded control character are acted on in  the  following
  manner:   FF  - skip to next column or page, CR - start new line, LF -
  start new line  unless  immediately  following  a  CR,  TAB  -  expand
  according to the /FTAB_EXPAND qualitier.

  Format:

        MCL input-file-name [/qualifiers]
2 Parameter

 input-file-name

  The name of the ASCII file which is to be copied into  a  Multi-Column
  format.
2 Command_Qualifiers
/FTAB_EXPAND

 /FTAB_EXPAND
 /NOFTAB_EXPAND (D)

  If this quilifier is positive, tab characters in the input  file  will
  be  expanded  according  to  the  manner in which the Fortran compiler
  would interpret them; otherwise, tab characters will  be  expanded  to
  the standard 8-column tab step.

/OUTPUT

 /OUTPUT=file-name

  The output file may be named explicitly by means of this qualifier.

/TRUNCATE

 /TRUNCATE
 /NOTRUNCATE (D)

  If this qualifier is positive, a line which exceeds the page width  on
  the  output  file will be truncated to the width of the page.  May not
  be used with WRAP.  The specification of TRUNCATE  will  override  the
  default specification of WRAP.

/WIDTH

 /WIDTH=width

  The  output  page  width  may   be   altered   with   this   qualifier
  [default=132].

/WRAP

 /WRAP (D)
 /NOWRAP

  If this qualifier is specified, a line which exceeds the page width on
  the  output  files  will  be  continued  on  the  following line.  The
  continuation line is flagged with the characters "-->".   May  not  be
  used with TRUNCATE.
