1	Find_Job
 FINDJOB is used to see if a job with a specified job name is currently
 executing in the specified batch queue. Input to the routine is via a
 DCL foreign command.  Output is returned in the DCL symbol $STATUS. 
 Only one level of generic queues is supported, ie. SYS$BATCH can point
 to NODE_BATCH, but NODE_BATCH must be an execution queue, not another
 generic queue.  See the source in-line comments for more information.

 DCL status returns:

	$Status = 1   => A non executing Job with specified name
			 already exists OR the QETQUI system 
			 service failed
	$Status = 3   => No Jobs with that name were found


 To use FINDJOB define a foreign command:

	$ FINDJOB == "$SYS$UTILITY:FINDJOB"

 and issue commands as follows:

	$ FINDJOB <queue_name> <job_name>

 Where  queue_name <= 31 characters (Limits on VMS Queue Names) 
	job_name   <= 39 characters (Limits on VMS Job_Names)
2	Sourc_Location
 Sources for Find_Job are located on DUA1:[SYSUTL.MISCUTL]
