1 gnuplot
 GNUPLOT is a command-driven interactive function plotting program. It
 is case sensitive (commands and function names written in lowercase
 are not the same as those written in CAPS). All command names may be
 abbreviated, as long as the abbreviation is not ambiguous. Any number
 of commands may appear on a line, separated by semicolons (;).
 Strings are indicated with quotes.  They may be either single or double
 quotation marks, e.g.,

          load "filename"
          cd 'dir'
 
 Any command-line arguments are assumed to be names of files containing 
 GNUPLOT commands, with the exception of standard X11 arguments, which
 are processed first. Each file is loaded with the `load` command, in the
 order specified. GNUPLOT exits after the last file is processed.  When
 no load files are named, gnuplot enters into an interactive mode.
 
 Commands may extend over several input lines, by ending each 
 line but the last with a backslash (\). The backslash must be the LAST
 character on each line. The effect is as if the backslash and newline
 were not there. That is, no white space is implied, nor is a comment
 terminated. Therefore, commenting out a continued line comments out
 the entire command (see `comment`).
 
 In this documentation, curly braces ({}) denote optional arguments to
 many commands, and a vertical bar (|) separates mutually exclusive
 choices.  GNUPLOT keywords or help topics are indicated by backquotes
 or `boldface` (where available).  Angle brackets (<>) are used to mark
 replaceable tokens.
 
 For help on any topic, type `help` followed by the name of the topic.

 The new GNUPLOT user should begin by reading about the `plot`
 command (type `help plot`).
2 cd
 The `cd` command changes the working directory.
 
 Syntax:
         cd "<directory-name>"
 
 The directory name must be enclosed in quotes.
 
 Examples:
         cd 'subdir'
         cd ".."
2 clear
 The `clear` command erases the current screen or output device as
 specified by `set output`. This usually generates a formfeed on
 hardcopy devices. Use `set terminal` to set the device type.
2 command-line editing
 The Unix and IBM PC versions of GNUPLOT support command-line editing.
 Also, a history mechanism allows previous commands to be edited, and
 re-executed. After the command line has been edited, a newline or
 carriage return will enter the entire line regardless of where the
 cursor is positioned.

 The editing commands are as follows:
 
 `Line editing`:
 
 ^B moves back a single character.
 ^F moves forward a single character.
 ^A moves to the beginning of the line.
 ^E moves to the end of the line.
 ^H and DEL delete the previous character.
 ^D deletes the current character.
 ^K deletes from current position to the end of line.
 ^L,^R redraws line in case it gets trashed.
 ^U deletes the entire line.
 ^W deletes the last word.

 `History`:
 
 ^P moves back through history.
 ^N moves forward through history.

 On the IBM PC the use of a TSR program such as DOSEDIT or CED may be
 desired for line editing. For such a case GNUPLOT may be compiled with
 no line editing capability (default makefile setup). Set READLINE in the
 makefile and add readline.obj to the link file if GNUPLOT line editing
 is to be used for the IBM PC. The following arrow keys may be used
 on the IBM PC version if readline is used:
 
 Left  Arrow     - same as ^B.
 Right Arrow     - same as ^F.
 Ctl Left  Arrow - same as ^A.
 Ctl Right Arrow - same as ^E.
 Up    Arrow     - same as ^P.
 Down  Arrow     - same as ^N.
2 comment
 Comments are supported as follows: a # may appear in most places in a line
 and GNUPLOT will ignore the rest of the line. It will not have this
 effect inside quotes, inside numbers (including complex numbers), inside
 command substitutions, etc. In short, it works anywhere it makes sense
 to work.
2 environment
 A number of shell environment variables are understood by GNUPLOT.
 None of these are required, but may be useful.
 
 If GNUTERM is defined, it is used as the name of the terminal type to
 be used. This overrides any terminal type sensed by GNUPLOT on start
 up, but is itself overridden by the .gnuplot (or equivalent) start-up
 file (see `start-up`), and of course by later explicit changes.
 
 On Unix, AmigaDOS, and MS-DOS, GNUHELP may be defined to be the pathname
 of the HELP file (gnuplot.gih).

 On VMS, the symbol GNUPLOT$HELP should be defined as the name of 
 the help library for GNUPLOT.
 
 On Unix, HOME is used as the name of a directory to search for 
 a .gnuplot file if none is found in the current directory.
 On AmigaDOS and MS-DOS, GNUPLOT is used. On VMS, SYS$LOGIN: is used.
 See help start-up.
 
 On Unix, PAGER is used as an output filter for help messages.
 
 On Unix and AmigaDOS, SHELL is used for the `shell` command. On MS-DOS,
 COMSPEC is used for the `shell` command.

 On AmigaDOS, GNUFONT is used for the screen font.  For example:
 "setenv GNUFONT sapphire/14".

 On MS-DOS, if the BGI interface is used, the variable `BGI` is used to point 
 to the full path to the BGI drivers directory. Furthermore SVGA is used to
 name the Super VGA BGI driver in 800x600 res., and its mode of operation
 as 'Name.Mode'.
 For example, if the Super VGA driver is C:\TC\BGI\SVGADRV.BGI and mode 3 is
 used for 800x600 res., then: 'set BGI=C:\TC\BGI' and 'set SVGA=SVGADRV.3'.
2 exit
 The commands `exit` and `quit` and the END-OF-FILE character
 will exit GNUPLOT. All these commands will clear the output device
 (as the `clear` command does) before exiting.
2 expressions
 In general, any mathematical expression accepted by C, FORTRAN,
 Pascal, or BASIC is valid. The precedence of these operators is
 determined by the specifications of the C programming language.
 White space (spaces and tabs) is ignored inside expressions.
 
 Complex constants may be expressed as the {<real>,<imag>}, where <real>
 and <imag> must be numerical constants. For example, {3,2}
 represents 3 + 2i; {0,1} represents `i` itself. The curly braces 
 are explicitly required here.
3 functions
 The functions in GNUPLOT are the same as the corresponding functions
 in the Unix math library, except that all functions accept integer,
 real, and complex arguments, unless otherwise noted. The `sgn`
 function is also supported, as in BASIC.
4 abs
 The `abs` function returns the absolute value of its argument. The
 returned value is of the same type as the argument.
 
 For complex arguments, abs(x) is defined as the length of x in the
 complex plane [i.e.,  sqrt(real(x)**2 + imag(x)**2) ].
4 acos
 The `acos` function returns the arc cosine (inverse cosine) of its
 argument. `acos` returns its argument in radians.
4 arg
 The `arg` function returns the phase of a complex number, in radians.
4 asin
 The `asin` function returns the arc sin (inverse sin) of its argument.
 `asin` returns its argument in radians.
4 atan
 The `atan` function returns the arc tangent (inverse tangent) of its
 argument. `atan` returns its argument in radians.
4 besj0
 The `besj0` function returns the j0th Bessel function of its argument.
 `besj0` expects its argument to be in radians.
4 besj1
 The `besj1` function returns the j1st Bessel function of its argument.
 `besj1` expects its argument to be in radians.
4 besy0
 The `besy0` function returns the y0th Bessel function of its argument.
 `besy0` expects its argument to be in radians.
4 besy1
 The `besy1` function returns the y1st Bessel function of its argument.
 `besy1` expects its argument to be in radians.
4 ceil
 The `ceil` function returns the smallest integer that is not less than its
 argument. For complex numbers, `ceil` returns the smallest integer
 not less than the real part of its argument.
4 cos
 The `cos` function returns the cosine of its argument. `cos` expects its
 argument to be in radians.
4 cosh
 The `cosh` function returns the hyperbolic cosine of its argument.
 `cosh` expects its argument to be in radians.
4 exp
 The `exp` function returns the exponential function of its argument
 (`e` raised to the power of its argument).
4 floor
 The `floor` function returns the largest integer not greater than its
 argument. For complex numbers, `floor` returns the largest
 integer not greater than the real part of its argument.
4 gamma
 The `gamma` function returns the gamma function of the real part of
 its argument. For integer n, gamma(n+1) = n! .
 If the argument is a complex value, the imaginary component is ignored.
4 imag
 The `imag` function returns the imaginary part of its argument as a
 real number.
4 int
 The `int` function returns the integer part of its argument, truncated
 toward zero.
4 log
 The `log` function returns the natural logarithm (base `e`) of its
 argument.
4 log10
 The `log10` function returns the logarithm (base 10) of its argument.
4 real
 The `real` function returns the real part of its argument.
4 sgn
 The `sgn` function returns 1 if its argument is positive, -1 if its
 argument is negative, and 0 if its argument is 0. If the argument
 is a complex value, the imaginary component is ignored.
4 sin
 The `sin` function returns the sine of its argument. `sin` expects its
 argument to be in radians.
4 sinh
 The `sinh` function returns the hyperbolic sine of its argument. `sinh`
 expects its argument to be in radians.
4 sqrt
 The `sqrt` function returns the square root of its argument.
4 tan
 The `tan` function returns the tangent of its argument. `tan` expects
 its argument to be in radians.
4 tanh
 The `tanh` function returns the hyperbolic tangent of its argument.
 `tanh` expects its argument to be in radians.
3 operators
 The operators in GNUPLOT are the same as the corresponding operators
 in the C programming language, except that all operators accept
 integer, real, and complex arguments, unless otherwise noted.
 The ** operator (exponentiation) is supported, as in FORTRAN.
 
 Parentheses may be used to change order of evaluation.
4 binary
 The following is a list of all the binary operators and their
 usages:
 
  Symbol      Example      Explanation
   **          a**b          exponentiation
   *           a*b           multiplication
   /           a/b           division
   %           a%b         * modulo
   +           a+b           addition
   -           a-b           subtraction
   ==          a==b          equality
   !=          a!=b          inequality
   &           a&b         * bitwise AND
   ^           a^b         * bitwise exclusive OR
   |           a|b         * bitwise inclusive OR
   &&          a&&b        * logical AND
   ||          a||b        * logical OR
   ?:          a?b:c       * ternary operation
 
 (*) Starred explanations indicate that the operator requires
 integer arguments.
 
 Logical AND (&&) and OR (||) short-circuit the way they do in C.
 That is, the second && operand is not evaluated if the first is
 false; the second || operand is not evaluated if the first is true.
 
 The ternary operator evaluates its first argument (a). If it is
 true (non-zero) the second argument (b) is evaluated and returned,
 otherwise the third argument (c) is evaluated and returned.
4 unary
 The following is a list of all the unary operators and their
 usages:
 
  Symbol     Example      Explanation
   -           -a          unary minus
   ~           ~a        * one's complement
   !           !a        * logical negation
   !           a!        * factorial
 
 (*) Starred explanations indicate that the operator requires an
 integer argument.
 
 The factorial operator returns a real number to allow a greater range.
2 help
 The `help` command displays on-line help. To specify information on a
 particular topic use the syntax:
 
         help {<topic>}
 
 If <topic> is not specified, a short message is printed about
 GNUPLOT. After help for the requested topic is given, help for a
 subtopic may be requested by typing its name, extending the help
 request. After that subtopic has been printed, the request may be
 extended again, or simply pressing return goes back one level to the
 previous topic. Eventually, the GNUPLOT command line will return.
2 load
 The `load` command executes each line of the specified input file as
 if it had been typed in interactively. Files created by the `save`
 command can later be `load`ed. Any text file containing valid
 commands can be created and then executed by the `load` command.
 Files being `load`ed may themselves contain `load` commands. See
 `comment` for information about comments in commands.
 
 The `load` command must be the last command on the line.
 
 Syntax:
         load "<input-file>"
 
 The name of the input file must be enclosed in quotes.
 
 Examples:
 
         load 'work.gnu'
         load "func.dat"
 
 The `load` command is performed implicitly on any file names given as
 arguments to GNUPLOT. These are loaded in the order specified, and
 then GNUPLOT exits.
2 pause
 The `pause` command displays any text associated with the command and
 then waits a specified amount of time or until the carriage return is
 pressed.  `pause` is especially useful in conjunction with `load` files.

 Syntax:
         pause <time> {"<string>"}

 <time> may be any integer constant or expression. Choosing -1 will
 wait until a carriage return is hit, zero (0) won't pause at all, and
 a positive integer will wait the specified number of seconds.
 
 Note: Since `pause` is not part of the plot it may interact with
 different device drivers differently (depending upon how text and
 graphics are mixed).
 
 Examples:
         pause -1    # Wait until a carriage return is hit
         pause 3     # Wait three seconds
         pause -1  "Hit return to continue"
         pause 10  "Isn't this pretty?  It's a cubic-spline."
 
2 plot
 `plot` and `splot` are the primary commands of the program. They plot
 functions and data in many, many ways. `plot` is used to plot 2-d
 functions and data, while `splot` plots 3-d surfaces and data.

 Syntax:
 
         plot {ranges}  <function> {title} {style}
                     {, <function> {title} {style}...}
 
         splot {ranges}  <function> {title} {style}
                      {, <function> {title} {style}...}
 
 where <function> is either a mathematical expression, the name of a
 data file enclosed in quotes, or a pair (`plot`) or triple (`splot`)
 of mathematical expressions in the case of parametric functions.
 User-defined functions and variables may also be defined here.
 
 `plot` and `splot` commands can be as simple as
 
         plot sin(x)
 
 and
 
         splot x * y
 
 or as complex as (!)
 
         plot [t=1:10] [-pi:pi*2] tan(t),"data.1" with lines,t**2 with points
3 data-file
 Discrete data contained in a file can displayed by specifying the
 name of the data file (enclosed in quotes) on the `plot` or `splot`
 command line. Data files should contain one data point per line.
 Lines beginning with # (or ! on VMS) will be treated as comments
 and ignored. For `plot`s, each data point represents an (x,y)
 pair. For `splot`s, each point is an (x,y,z) triple. For `plot`s with
 error bars (see `plot errorbars`), each data point is either
 (x,y,ydelta) or (x,y,ylow,yhigh). In all cases, the numbers on each
 line of a data file must be separated by blank space. This blank
 space divides each line into columns.

 For `plot`s the x value may be omitted, and for `splot`s the x
 and y values may be omitted. In either case the omitted values are
 assigned the current coordinate number. Coordinate numbers start at 0
 and are incremented for each data point read.

 To specify other formats, see `plot datafile using`.
 
 In the `plot` command, blank lines in the data file cause a break in
 the plot. There will be no line drawn between the preceding and
 following points if the plot style is `lines` or `linespoints` (see
 `plot style`). This does not change the plot style, as would plotting
 the data as separate curves.
 
 This example compares the data in the file population.dat to a
 theoretical curve:
 
         pop(x) = 103*exp((1965-x)/10)
         plot [1960:1990] 'population.dat', pop(x)
 
 The file population.dat might contain:
 
         # Gnu population in Antarctica since 1965
         1965   103
         1970   55
         1975   34
         1980   24
         1985   10
 
 When a data file is plotted, `samples` and `iso_samples` are ignored.
 Curves plotted using the `plot` command are automatically extended to
 hold the entire curve. Similarly grid data plotted using the `splot`
 command is automatically extended, using the assumption that isolines
 are separated by blank lines (a line with only a CR/LF in it).
 
 Implicitly, there are two types of 3-d datafiles. If all the isolines
 are of the same length, the data is assumed to be a grid data, i.e.,
 the data has a grid topology. Cross isolines in the other parametric
 direction (the ith cross isoline passes thru the ith point of all the
 provided isolines) will also be drawn for grid data. (Note contouring
 is available for grid data only.) If all the isolines are not of the
 same length, no cross isolines will be drawn and contouring that data
 is impossible.
 
 For splot if 3-d datafile and using format (see `splot datafile using`)
 specify only z (height field), a non parametric mode must be specified.
 If, on the other hand, x, y, and z are all specified, a parametric
 mode should be selected (see `set parametric`) since data is defining a
 parametric surface.

 A simple example of plotting a 3-d data file is
 
         splot 'glass.dat'

 For more information about 3-d plotting, see `splot`.
4 using
 The format of data within a file can be selected with the `using` 
 option. An explicit scanf string can be used, or simpler column
 choices can be made.
 
 Syntax:
 
         plot "datafile" { using { <ycol> |
                                   <xcol>:<ycol> |
                                   <xcol>:<ycol>:<ydelta> |
                                   <xcol>:<ycol>:<ylow>:<yhigh> }
                                 {"<scanf string>"} } ...

 and

         splot "datafile" { using { <xcol>:<ycol>:<zcol> | <zcol> }
                                  {"<scanf string>"} } ...
 
 <xcol>, <ycol>, and <zcol> explicitly select the columns to plot from
 a space or tab separated multicolumn data file. If only <ycol> is
 selected for `plot`, <xcol> defaults to 1. If only <zcol> is selected
 for `splot`, then only that column is read from the file. An <xcol> of
 0 forces <ycol> to be plotted versus its coordinate number. <xcol>,
 <ycol>, and <zcol> can be entered as constants or expressions.

 If errorbars (see also `plot errorbars`) are used for `plot`s,
 ydelta (for example, a +/- error) should be provided as the third
 column, or ylow and yhigh as third and fourth columns.  These columns
 must follow the x and y columns.

 Scanf strings override any <xcol>:<ycol>(:<zcol>) choices, except for
 ordering of input, e.g.,
         plot "datafile" using 2:1 "%f%*f%f"
 causes the first column to be y and the third column to be x.

 If the scanf string is omitted, the default is generated based on the
 <xcol>:<ycol>(:<zcol>) choices. If the `using` option is omitted, "%f%f"
 is used for `plot` ("%f%f%f%f" for `errorbar` `plot`s) and "%f%f%f" is
 used for `splot`.
 
 Examples:
 
         plot "MyData" using "%*f%f%*20[^\n]%f" with lines

 Data are read from the file "MyData" using the format
 "%*f%f%*20[^\n]%f". The meaning of this format is: "%*f" ignore the
 first number, "%f" then read in the second and assign to x,
 "%*20[^\n]" then ignore 20 non-newline characters, "%f" then read in
 the y value.

         n=3;
         plot "MyData", "MyData" using n 

 causes GNUPLOT to plot the second and third columns of MyData versus
 the first column. The command 'n=4; replot' would then plot the second
 and fourth columns of MyData versus the first column.
 
         splot "glass.dat" using 1

 causes GNUPLOT to plot the first coordinate of the points of glass.dat
 as the z coordinate while ignoring the other two coordinates.
 
 Note: GNUPLOT first reads a line of the data file into a buffer and 
 then does a 
         sscanf(input_buffer, scanf_string, &x, &y{, &z});
 where 'x', 'y', and 'z' are of type 'float'. Any scanf string that
 specifies two (three for `splot`, three or four for `errorbars`) float
 numbers may be used.
3 errorbars
 Error bars are supported for 2-d data file plots by reading one or
 two additional columns specifying ydelta or ylow and yhigh
 respectively. No support exists for x error bars or any error bars
 for `splot`s.

 In the default situation, GNUPLOT expects to see three or four
 numbers on each line of the data file, either (x, y, ydelta) or 
 (x, y, ylow, yhigh). The x coordinate must be specified. The order
 of the numbers must be exactly as given above. Data files in this
 format can easily be plotted with error bars:

         plot "data.dat" with errorbars

 The error bar is a vertical line plotted from (x, ylow) to (x,
 yhigh). If ydelta is specified instead of ylow and yhigh, 
 ylow=y-ydelta and yhigh=y+ydelta are derived. If there
 are only two numbers on the line, yhigh and ylow are both set to
 y. To get lines plotted between the data points, `plot` the
 data file twice, once with errorbars and once with lines.

 If y autoscaling is on, the y range will be adjusted to fit the
 error bars.

 The `using` option may be used to specify how columns of the data file
 are to be assigned to x, y, ydelta, ylow, and yhigh. The x column must
 be provided and both the x and y columns must appear before the
 errorbar columns. If three column numbers are given, they are x, y,
 and ydelta. If four columns are given, they are x, y, ylow, and
 yhigh.

 Examples:
 
         plot "data.dat" using 1:2:3:4 with errorbars
         plot "data.dat" using 3:2:6 with errorbars
         plot "data.dat" using 3:4:8:7 with errorbars
 
 The first example reads, x, y, ylow, and yhigh, from columns 1, 2, 3,
 and 4. This is equivalent to the default.  The second example reads x
 from the third column, y from second and ydelta from the sixth column.
 The third example reads x from the third column, y from the fourth,
 ylow from the eighth, and yhigh from seventh columns.
 
 See also `plot using` and `plot style`.
3 parametric
 When in parametric mode (`set parametric`) mathematical expressions must
 be given in pairs for `plot` and in triplets for `splot`:
         plot sin(t),t**2
 or
         splot cos(u)*cos(v),cos(u)*sin(v),sin(u)
 
 Data files are plotted as before, except any preceding parametric
 function must be fully specified before a data file is given as a
 plot. In other words, the x parametric function (sin(t) above) and
 the y parametric function (t**2 above) must not be interrupted with
 any modifiers or data functions; doing so will generate a syntax error
 stating that the parametric function is not fully specified.
 
 Ranges take on a different meaning when in parametric mode. The first
 range on the `plot` command is the `trange`, the next is the `xrange`,
 and the last is the `yrange`. For `splot` the order is `urange`,
 `vrange`, `xrange`, `yrange`, and finally `zrange`. The following
 `plot` command shows setting the `trange` to [-pi:pi], the `xrange` to
 [-1.3:1.3] and the `yrange` to [-1:1] for the duration of the plot:
         plot [-pi:pi] [-1.3:1.3] [-1:1] sin(t),t**2
 
 Other modifiers, such as `with` and `title`, may be specified only
 after the parametric function has been completed:
         plot sin(t),t**2 title 'Parametric example' with linespoints
3 ranges
 The optional range specifies the region of the plot that will be
 displayed.
 
 Ranges may be provided on the `plot` and `splot` command line and
 affect only that plot, or in the `set xrange`, `set yrange`, etc.,
 commands, to change the default ranges for future plots.
 
 Syntax:
         [{<dummy-var> =} {<xmin> : <xmax>}] { [{<ymin> : <ymax>}] }
 
 where <dummy-var> is the independent variable (the defaults are x and
 y, but this may be changed with `set dummy`) and the min and max
 terms can be constant expressions.
 
 Both the min and max terms are optional. The ':' is also optional
 if neither a min nor a max term is specified. This allows '[ ]' to
 be used as a null range specification.
 
 Specifying a range in the `plot` command line turns autoscaling for
 that axis off for that plot. Using one of the `set` range commands
 turns autoscaling off for that axis for future plots, unless changed
 later. (See `set autoscale`).
 
 Examples:
 
 This uses the current ranges:
         plot cos(x)
 
 This sets the x range only:
         plot [-10:30] sin(pi*x)/(pi*x)
 
 This is the same, but uses t as the dummy-variable:
         plot [t = -10 :30]  sin(pi*t)/(pi*t)
 
 This sets both the x and y ranges:
         plot [-pi:pi] [-3:3]  tan(x), 1/x
 
 This sets only the y range, and turns off autoscaling on both axes:
         plot [ ] [-2:sin(5)*-8] sin(x)**besj0(x)
 
 This sets xmax and ymin only:
         plot [:200] [-pi:]  exp(sin(x))
 
 This sets the x, y, and z ranges:
         splot [0:3] [1:4] [-1:1] x*y
3 style
 Plots may be displayed in one of six styles: `lines`, `points`,
 `linespoints`, `impulses`, `dots`, or `errorbars`. The `lines` style
 connects adjacent points with lines. The `points` style displays a
 small symbol at each point. The `linespoints` style does both
 `lines` and `points`. The `impulses` style displays a vertical line
 from the x axis (or from the grid base for `splot`) to each point. The
 `dots` style plots a tiny dot at each point; this is useful for
 scatter plots with many points.

 The `errorbars` style is only relevant to 2-d data file plotting. It
 is treated like `points` for `splot`s and function `plot`s. For data
 `plot`s, `errorbars` is like `points`, except that a vertical error 
 bar is also drawn: for each point (x,y), a line is drawn from
 (x,ylow) to (x,yhigh). A tic mark is placed at the ends of the error
 bar. The ylow and yhigh values are read from the data file's columns,
 as specified with the `using` option to plot. See `plot errorbars` for
 more information.
 
 Default styles are chosen with the `set function style` and
 `set data style` commands.
 
 By default, each function and data file will use a different 
 line type and point type, up to the maximum number of available 
 types. All terminal drivers support at least six different point
 types, and re-use them, in order, if more than six are required.
 The LaTeX driver supplies an additional six point types (all variants
 of a circle), and thus will only repeat after twelve curves are
 plotted with points.
 
 If desired, the style and (optionally) the line type and point type
 used for a curve can be specified.

 Syntax:
 
         with <style> {<linetype> {<pointtype>}}
 
 where <style> is either `lines`, `points`, `linespoints`, `impulses`,
 `dots`, or `errorbars`. The <linetype> and <pointtype> are positive
 integer constants or expressions and specify the line type and point
 type to be used for the plot. Line type 1 is the first line type used
 by default, line type 2 is the second line type used by default, etc.
 
 Examples:
 
 This plots sin(x) with impulses:
         plot sin(x) with impulses
 
 This plots x*y with points, x**2 + y**2 default:
         splot x*y w points, x**2 + y**2
 
 This plots tan(x) with the default function style, "data.1" with lines:
         plot [ ] [-2:5] tan(x), "data.1" with l
 
 This plots "leastsq.dat" with impulses:
         plot 'leastsq.dat' w i
 
 This plots "exper.dat" with errorbars and lines connecting the points:
         plot 'exper.dat' w lines, 'exper.dat' w errorbars
 Here 'exper.dat' should have three or four data columns.
 
 This plots x**2 + y**2 and x**2 - y**2 with the same line type:
         splot x**2 + y**2 with line 1, x**2 - y**2 with line 1
 
 This plots sin(x) and cos(x) with linespoints, using the
 same line type but different point types:
         plot sin(x) with linesp 1 3, cos(x) with linesp 1 4
 
 This plots file "data" with points style 3:
         plot "data" with points 1 3 
 Note that the line style must be specified when specifying the point
 style, even when it is irrelevant. Here the line style is 1 and the
 point style is 3, and the line style is irrelevant.
 
 See `set style` to change the default styles.
3 title
 A title of each plot appears in the key. By default the title is
 the function or file name as it appears on the plot command line.
 The title can be changed by using the `title` option. This option 
 should precede any `with` option.
 
 Syntax:
         title "<title>"
 
 where <title> is the new title of the plot and must be enclosed in
 quotes. The quotes will not be shown in the key.
 
 Examples:
 
 This plots y=x with the title 'x':
         plot x
 
 This plots the "glass.dat" file with the title 'surface of revolution':
         splot "glass.dat" title 'surface of revolution'
 
 This plots x squared with title "x^2" and "data.1" with title
 'measured data':
         plot x**2 title "x^2", "data.1" t 'measured data'
2 print
 The `print` command prints the value of <expression> to the screen.
 
 Syntax:
         print <expression>
 
 See `expressions`.
2 pwd
 The `pwd` command prints the name of the working directory to the screen.
 
 Syntax:
         pwd
2 quit
 The `exit` and `quit` commands and END-OF-FILE character will exit
 GNUPLOT. All these commands will clear the output device (as the
 `clear` command does) before exiting.
2 replot
 The `replot` command without arguments repeats the last `plot` or `splot`
 command. This can be useful for viewing a plot with different `set`
 options, or when generating the same plot for several devices.
 
 Arguments specified after a `replot` command will be added onto the last
 `plot` (`splot`) command (with an implied ',' separator) before it is
 repeated. `replot` accepts the same arguments as the `plot` (`splot`)
 commands except that ranges cannot be specified. See `command-line
 editing` for ways to edit the last `plot` (`splot`) command.
2 save
 The `save` command saves user-defined functions, variables, set
 options or all three plus the last `plot` (`splot`) command to the
 specified file.
 
 Syntax:
         save  {<option>} "<filename>"
 
 where <option> is `functions`, `variables` or `set`. If no option is
 used, GNUPLOT saves functions, variables, set options and the last `plot`
 (`splot`) command.
 
 `save`d files are written in text format and may be read by the `load`
 command.
 
 The filename must be enclosed in quotes.
 
 Examples:
 
         save "work.gnu"
         save functions 'func.dat'
         save var 'var.dat'
         save set "options.dat"
2 set-show
 The `set` command sets LOTS of options.
 
 The `show` command shows their settings. `show all` shows all the
 settings.
3 angles
 By default, GNUPLOT assumes the independent variable in polar plots
 is in units of radians. If `set angles degrees` is specified before
 `set polar` then the default range is [0:360] and the independent
 variable has units of degrees. This is particularly useful for
 plots of data files. The angle setting also hold for the 3-d
 mapping as set via the `set mapping` command.

 Syntax:
         set angles { degrees | radians }
         show angles
3 arrow
 Arbitrary arrows can be placed on a plot using the `set arrow`
 command.
 
 Syntax:
 
          set arrow {<tag>} {from <sx>,<sy>{,<sz>}} 
                            {to <ex>,<ey>{,<ez>}} {{no}head}
          set noarrow {<tag>}
          show arrow
 
 
 Unspecified coordinates default to 0. The x, y, and z values are in
 the graph's coordinate system. The z coordinate is only used in
 `splot` commands. <tag> is an integer that identifies the arrow. If no
 tag is given, the lowest unused tag value is assigned automatically.
 The tag can be used to delete or change a specific arrow. To change
 any attribute of an existing arrow, use the `set arrow` command with
 the appropriate tag, and specify the parts of the arrow to be
 changed. Specifying nohead requests the arrow be drawn without a head
 (yielding a line segment). By default, arrows have heads.
 
 Arrows outside the plotted boundaries are permitted but may cause
 device errors.
 
 Examples:
 
 To set an arrow pointing from the origin to (1,2), use:
          set arrow to 1,2
 To set an arrow from (-10,4,2) to (-5,5,3), and tag the arrow number
 3, use:
          set arrow 3 from -10,4,2 to -5,5,3
 To change the preceding arrow begin at 1,1,1, without an arrow head,
 use:
          set arrow 3 from 1,1,1 nohead
 To delete arrow number 2 use:
          set noarrow 2
 To delete all arrows use:
          set noarrow
 To show all arrows (in tag order) use:
          show arrow
3 autoscale
 Auto scaling may be set individually on the x, y or z axis
 or globally on all axes. The default is to autoscale all axes.
 
 When autoscaling, the plot range is automatically computed and the
 dependent axis (y for a `plot` and z for `splot`) is scaled to
 include the range of the function or data being plotted.
 
 If autoscaling of the dependent axis (y or z) is not set, the
 current y or z range is used.
 
 See `set yrange` or `set zrange`.
 
 Autoscaling the independent variables (x for `plot` and x,y for
 `splot`) is a request to set the domain to match any data file being
 plotted. If there are no data files then autoscaling an independent
 variable has no effect. In other words, in the absence of a data
 file, functions alone do not affect the x range (or the y range if
 plotting z = f(x,y)).
 
 See `set xrange`, or `set yrange`.
 
 The behavior of autoscaling remains consistent in parametric mode,
 however, there are more dependent variables and hence more control
 over x, y, and z plot scales. In parametric mode, the independent or
 dummy variable is t for `plot`s and u,v for `splot`s.  Autoscale in
 parametric mode, then, controls all ranges (t, u, v, x, y, and z) and
 allows x, y, and z to be fully autoscaled.
 
 See `set parametric`.
 
 Syntax:
         set autoscale <axes>
         set noautoscale <axes>
         show autoscale
 
 where <axes> is either `x`, `y`, `z` or `xy`. If <axes> is not given
 then all axes are assumed.
 
 Examples:
 
 This sets autoscaling of the y axis. x axis autoscaling is not
 affected.
         set autoscale y
 
 This sets autoscaling of the x and y axes.
         set autoscale xy
 
 This sets autoscaling of the x, y and z axes.
         set autoscale
 
 This disables autoscaling of the x, y and z axes.
         set noautoscale
 
 This disables autoscaling of the z axis only.
         set noautoscale z
4 parametric mode
 When in parametric mode (`set parametric`) the xrange is as
 fully scalable as the yrange. In other words, in parametric
 mode the x axis can be automatically scaled to fit the range
 of the parametric function that is being plotted. Of course,
 the y axis can also be automatically scaled just as in the
 non-parametric case. If autoscaling on the x axis is not set,
 the current x range is used.
 
 When there is a mix of data files and functions, the xrange of
 the functions is selected as that of the data files if autoscale
 is true for x. While this keeps the behavior compatible with
 non-parametric plotting, it may not be retained in the future.
 The problem is that, in parametric mode, the x and y ranges are
 not as distinguishable as in the non-parametric mode and this
 behavior may not be the most useful.
 
 For completeness a last command `set autoscale t` is accepted.
 However, the effect of this "scaling" is very minor. When
 GNUPLOT determines that the t range would be empty it makes a
 small adjustment if autoscaling is true. Otherwise, GNUPLOT
 gives an error. Such behavior may, in fact, not be very useful
 and the command `set autoscale t` is certainly questionable.
 
 `splot` extends the above idea similarly. If autoscaling is set then
 x, y, and z ranges are computed and each axis scaled to fit the
 resulting data.
3 border
 The `set border` and `set noborder` commands controls the display of
 the plot borders for the `plot` and `splot` commands.
 
 Syntax:
         set border
         set noborder
         show border
3 clip
 GNUPLOT can clip data points and lines that are near the boundaries
 of a plot. 
 
 Syntax:
         set clip <clip-type>
         set noclip <clip-type>
         show clip

 Three clip types are supported by GNUPLOT: `points`, `one`, and `two`.
 One, two, or all three clip types may be active for a single plot.

 The `points` clip type forces GNUPLOT to clip (actually, not plot at
 all) data points that fall within but too close to the boundaries
 (this is so the large symbols used for points will not extend outside
 the boundary lines). Without clipping points near the boundaries may
 look bad; try adjusting the x and y ranges.

 Setting the `one` clip type causes GNUPLOT to plot the line segments
 which have only one of the two endpoints with the plotting region.
 Only the in-range portion of the line is drawn.  The alternative is to
 not draw any portion of the line segment.

 Some lines may have both endpoints out of range, but pass through the
 plotting area. Setting the `two` clip-type allows the visible portion
 of these lines to be drawn.
 
 In no case is a line drawn outside the plotting area.

 The defaults are `noclip points`, `clip one`, and `noclip two`.

 To check the state of all forms of clipping, use
         show clip

 For backward compatibility with older versions, the following forms
 are also permitted.
        set clip
        set noclip
 `set clip` is synonymous with `set clip points`. `set noclip` turns
 off all three types of clipping.
3 Cntrparam
 Sets the different parameters for the contouring plot (see also `contour`).
 
 Syntax:
         set cntrparam { { linear | cubicspline | bspline } |
                         points <n> |
                         levels <n> |
                         order <n> }
 
 This command controls the way contours are plotted. <n> should be an
 integral constant expression. The parameters are:
 
 `linear`, `cubicspline`, `bspline` - Controls type of approximation or
 interpolation. If `linear`, then the contours are drawn piecewise
 linear, as extracted from the surface directly. If `cubicspline`, then
 piecewise linear contours are interpolated to form a somewhat smoother
 contours, but which may undulate. The third option is the uniform
 `bspline`, which only approximates the piecewise linear data but is
 guaranteed to be smoother.
 
 `points` - Eventually all drawings are done with piecewise linear
 strokes.  This number controls the number of points used to
 approximate a curve.  Relevant for `cubicspline` and `bspline` modes
 only.
 
 `levels` - Number of contour levels. If the surface is bounded by zmin
 and zmax then contours will be generated from zmin+dz to zmax-dz
 in steps of size dz, where dz = (zmax - zmin) / (levels + 1).
 
 `order`  - Order of the bspline approximation to be used. The bigger this
 order is, the smoother the resulting contour.  (Of course, higher order
 bspline curves will move further away from the original peicewise linear
 data.)  This option is relevant for `bspline` mode only. Allowed values are 
 integers in the range from 2 (linear) to 10.
3 contour
 Enable contour drawing for surfaces. This option is available for `splot`
 only.
 
 Syntax:
         set contour { base | surface | both }
         set nocontour
 
 If no option is provided to `set contour`, the default is `base`.
 The three options specify where to draw the contours: `base` draws
 the contours on the grid base where the x/ytics are placed, `surface`
 draws the contours on the surfaces themselves, and `both` draws the
 contours on both the base and the surface.
 
 See also `set cntrparam` for the parameters that affect the drawing of 
 contours.
3 data style
 The `set data style` command changes the default plotting style
 for data plots.

 Syntax:
         set data style 
         show data style 
         set data style <style-choice>

 In the first case, `set data style` returns the possible style
 choices:  `lines`, `points`, `linespoints`, `dots`, `impulses`, 
 or `errorbars`.  `show data style` shows the current default
 plotting style for data.  `set data style dots` would actually 
 change the default plotting style.  See also `plot`.
3 dummy
 By default, GNUPLOT assumes that the independent variable for the
 `plot` command is x, and the independent variables for the `splot`
 command are x and y. They are called the dummy variables because it
 is just a notation to indicate the independent variables. The `set
 dummy` command changes these default dummy variable names. For
 example, it may be more convenient to call the dummy variable t
 when plotting time functions:
 
         set dummy t
         plot sin(t), cos(t)
 
 Syntax:
         set dummy <dummy-var>{,<dummy-var>}
         show dummy
 
 Examples:
         set dummy u,v
         set dummy ,s
 
 to set both dummy variables to u and v or set only the second
 variable to s.
 
 The `set parametric` command also changes the dummy variables (to t
 for `plot` and u,v for `splot`s).
 
3 format
 The format of the tic-mark labels can be set with the `set format`
 command. The default format for both axes is "%g", but other formats
 such as "%.2f" or "%3.0fm" are often desirable. Anything accepted by
 printf when given a double precision number, and then accepted by the
 terminal, will work. In particular, the formats f, e, and g will work,
 and the d, o, x, c, s, and u formats will not work.
 
 Syntax:
         set format {<axes>} {"<format-string>"}
         show format
 
 where <axes> is either `x`, `y`, `z`, `xy`, or nothing (which is the
 same as `xy`). The length of the string representing a ticmark (after
 formatting with printf) is restricted to 100 characters.  If the
 format string is omitted, the format will be returned to the default
 "%g". For LaTeX users, the format "$%g$" is often desirable.  If the
 empty string "" is used, no label will be plotted with each tic,
 though the tic mark will still be plotted. To eliminate all tic marks,
 use `set noxtics` or `set noytics`.
 
 See also `set xtics` and `set ytics` for more control over tic labels.
3 function style
 The `set function style` command changes the default plotting style
 for functions.

 Syntax:
         set function style 
         show function style 
         set function style <style-choice>

 In the first case, `set function style` returns the possible style
 choices:  `lines`, `points`, `linespoints`, `dots`, `impulses`, 
 or `errorbars`.  `show function style` shows the current default
 plotting style for functions.  `set function style linespoints`
 would actually change the default plotting style.  See also `plot`.
3 functions
 The `show functions` command lists all user-defined functions and
 their definitions.
 
 Syntax:
         show functions
3 grid
 The optional `set grid` draws a grid at the tic marks with the axis
 linetype.
 
 Syntax:
         set grid
         set nogrid
         show grid
3 isosamples
 An isoline is a curve parametrized by one of the surface parameters
 while the other surface parameter is fixed. Isolines are a simple
 means to display a surface. By fixing the u parameter of surface
 s(u,v), the iso-u lines of the form c(v) = s(u0,v) are produced, and
 by fixing the v parameter, the iso-v lines of the form c(u) = s(u,v0)
 are produced.
 
 The isoline density of surfaces may be changed by the `set isosamples`
 command. By default, sampling is set to 10 isolines per u or v axis.
 A higher sampling rate will produce more accurate plots, but will take
 longer. This parameter has no effect on data file plotting.
 
 Syntax:
         set isosamples <expression>
         show isosamples
3 key
 The `set key` enables a key describing curves on a plot.  By default
 the key is placed in the upper right corner of the plot.
 
 Syntax:
         set key
         set key <x>,<y>{,<z>}
         set nokey
         show key
 
 The coordinates <x>, <y> (and <z> for `splot`s) specify the location
 of the key on the plot. The key is drawn as a sequence of lines, with
 one plot described on each line. On the right hand side of each line
 is a representation that attempts to mimic the way the curve is
 plotted.  On the left side of each line is the text description,
 obtained from the `plot` command. See `plot title` to change this
 description. The lines are vertically arranged so an imaginary
 straight line divides the left- and right-hand sides of the key. It is
 the coordinates of this line that are specified with the `set key`
 command. In a `plot`, only the x and y coordinates are used to specify
 the line position.  For a `splot`, x, y and z are all being used as a
 3-d location mapped using the same mapping as the plot itself to form
 the required 2-d screen position of the imaginary line.
 
 Some or all of the key may be outside of the plot boundary, although
 this may interfere with other labels and may cause an error on some
 devices.
 
 Examples:
 
 This places the key at the default location:
         set key
 This disables the key:
         set nokey
 This places a key at coordinates 2,3.5,2
         set key 2,3.5,2
3 label
 Arbitrary labels can be placed on the plot using the `set label`
 command.  If the z coordinate is given on a `plot` it is ignored; if
 it is missing on a `splot` it is assumed to be 0.
 
 Syntax:
 
          set label {<tag>} {"<label_text>"} {at <x>,<y>{,<z>}}
                            {<justification>}
          set nolabel {<tag>}
          show label
 
 
 The text defaults to "", and the position to 0,0,0.  The <x>, <y>, and
 <z> values are in the graph's coordinate system.  The tag is an
 integer that is used to identify the label. If no <tag> is given, the
 lowest unused tag value is assigned automatically. The tag can be used
 to delete or change a specific label. To change any attribute of an
 existing label, use the `set label` command with the appropriate tag,
 and specify the parts of the label to be changed.
 
 By default, the text is placed flush left against the point x,y,z.
 To adjust the way the label is positioned with respect to the point
 x,y,z, add the parameter <justification>, which may be `left`, `right`
 or `center`, indicating that the point is to be at the left, right or
 center of the text. Labels outside the plotted boundaries are
 permitted but may interfere with axes labels or other text.
 
 Examples:
 
 To set a label at (1,2) to "y=x" use:
          set label "y=x" at 1,2
 To set a label "y=x^2" with the right of the text at (2,3,4), and tag
 the label number 3, use:
          set label 3 "y=x^2" at 2,3,4 right
 To change the preceding label to center justification, use:
          set label 3 center
 To delete label number 2 use:
          set nolabel 2
 To delete all labels use:
          set nolabel
 To show all labels (in tag order) use:
          show label
 
 (The Latex, EEPIC, and Imagen drivers allow \\ in a string to specify
 a newline.)
3 logscale
 Log scaling may be set on the x, y, and z axes.
 
 Syntax:
         set logscale <axes>
         set nologscale <axes>
         show logscale
 
 where <axes> may be any combinations of `x`, `y`, and `z`, in any
 order.  If <axes> is not given then all three axes are assumed.  The
 command `set logscale` turns on log scaling on the specified axes,
 while `set nologscale` turns off log scaling.
 
 Examples:
 
 To enable log scaling in both x and z axes:
        set logscale xz
 To disable z axis log scaling:
        set nologscale z
3 mapping
 
 Syntax:
         set mapping { cartesian | spherical | cylindrical }
 
 Data for `splot`s are usually in regular Euclidean space and are
 provided in Cartesian coordinates. Such 3-d data require three
 coordinates (x, y and z) or one coordinate (only z) in each line in
 the data file.  In order to be able to use spherical or cylindrical
 coordinate systems, use the `set mapping` command. In both cases two
 coordinates are expected in each line of the data. For a spherical
 coordinate system, these are theta and phi (in units as specified by
 `set angles`) and the mapping is:
 
         x = cos( theta ) * cos( phi )
         y = sin( theta ) * cos( phi )
         z = sin( phi )
 
 For a cylindrical coordinate system, the mapping uses two variables,
 theta (in units as specified by `set angles`) and z:
 
         x = cos( theta )
         y = sin( theta )
         z = z
 
 Again, note that mapping will affect data file `splot`s only.
3 offsets
 The amount of the graph that the plot takes up may be controlled to
 some extent with the `set offsets` command. This command takes four
 offset arguments: <left>, <right>, <top> and <bottom>. By default,
 each offset is 0. Each offset may be a constant or an expression. Left
 and right offsets are given in units of the x axis, while top and
 bottom offsets are given in units of the y axis. The plot of sin(x),
 displayed with offsets of 0, 0, 2, 2 will take up 1/3 of the
 displayed y axis. Offsets are particularly useful with polar
 coordinates as a means of compensating for aspect ratio distortion.
 Offsets are ignored in `splot`s.
 
 Syntax:
         set offsets <left>, <right>, <top>, <bottom>
         show offsets
3 output
 By default, plots are displayed to the standard output. The `set
 output` command redirects the display to the specified file or
 device.
 
 Syntax:
         set output {"<filename>"}
         show output
 
 The filename must be enclosed in quotes. If the filename is
 omitted, output will be sent to the standard output.
3 parametric
 The `set parametric` command changes the meaning of `plot` (`splot`)
 from normal functions to parametric functions. The command
 `set noparametric` changes the plotting style back to normal,
 single-valued expression plotting.
 
 In 2-d plotting, a parametric function is determined by a pair
 of parametric functions operating on a parameter. An example
 of a 2-d parametric function would be plot sin(t),cos(t) (which
 defines a circle).
 
 For 3-d plotting, the surface is described as x=f(u,v), y=g(u,v),
 z=h(u,v). Therefore a triplet of functions are required. An example of
 3-d parametric function would be cos(u)*cos(v),cos(u)*sin(v),sin(u)
 (which defines a sphere). It takes three parametric function
 specifications in terms of the parametric dummy arguments to describe
 a single graph.
 
 The total set of possible plots is a superset of the simple f(x)
 style plots, since the two (three) functions can describe the
 x and y (and z) values to be computed separately. In fact,
 plots of the type t,f(t) (u,v,f(u,v)) are equivalent to those
 produced with f(x) when the x values are computed using the
 identity function as the first function.
 
 Note that the order the parametric functions are specified is
 xfunction, yfunction (and zfunction) and that each operates over the
 common parametric domain.
 
 Also, the `set parametric` function implies a new range of values.
 Whereas the normal f(x) and f(x,y) style plotting assume an xrange
 and yrange (and zrange), the parametric mode additionally specifies a
 trange, urange, and vrange. These ranges may be set
 directly with `set trange`, `set urange` and `set vrange`, or by
 specifying the range on the `plot` or `splot` commands. Currently
 the default range for these parametric variables is [-5:5].
 Setting the ranges to something more meaningful is expected.
3 polar
 The `set polar` command changes the meaning of the plot from
 rectangular coordinates to polar coordinates. In polar coordinates,
 the dummy variable (x) is an angle. The range of this angle is changed
 from whatever it was to [0:2*pi], or, if degree unit has been selected,
 to [0:360] (see `set angles`).
 
 The command `set nopolar` changes the meaning of the plot back to the
 default rectangular coordinate system. The range of x is changed from
 whatever it was to [-10:10].
 
 The `set polar` command is not supported for `splot`s.  See the
 `set mapping` command for similar functionality for `splot`s.
 
 While in polar coordinates the meaning of an expression in x is really
 r = f(x), where x is an angle of rotation. The xrange controls the
 domain (the angle) of the function, and the yrange controls the range
 (the radius). The plot is plotted in a rectangular box, and the x and
 y axes are both in units of the radius. Thus, the yrange controls both
 dimensions of the plot output. The tics and units are written along
 the axes rather than at the left and bottom. These unit are offset by
 <rmin> specified by the `rrange` (See `set rrange`). It is not
 possible to specify different output dimensions in the x or y
 directions. The yrange can be used to shift the plot diagonally to
 display only the first or third quadrants.
 
 Syntax:
         set polar
         set nopolar
         show polar
 Example:
         set polar
         plot x*sin(x)
         plot [-2*pi:2*pi] [-3:3] x*sin(x)
 The first plot uses the default polar angular domain of 0 to 2*pi.
 The radius (and the size of the plot) is scaled automatically. The
 second plot expands the domain, and restricts the range of the radius
 (and the size of the plot) to [-3:3].
3 rrange
 The `set rrange` command sets the radial range used to compute x and y
 values when in polar mode. If not in polar mode (see `set polar`) then
 this range is not used. Use of this command offsets the polar
 singularity to the <rmin> value and shifts the units on the axes tic
 marks. For instance, `set rrange [-40:40]` would set the origin to -40
 and would plot values of radial values between -40 to 40. Thus, if
 360 degrees of data were plotted, then the plot would extend 80 units
 in radially from the origin.  To view the entire plot,  a 
 `set yrange [-80:80]` command would create a square viewport with
 a circular plot tangent at the axes.  Because `xrange` is used
 specify the angular extent, only a square viewport can be specified
 by `yrange`.  For instance, `set yrange [0:80]` would display the
 first quadrant and `set yrange [-80:0]` would display the third
 quadrant.  Any square viewport of any size can be specified but it
 is constrained to be centered on a 45 degree line.
 
 This range may also be specified on the `plot` command line when in
 polar mode.
 
 Syntax:
         set rrange [{<rmin> : <rmax>}]
 
 where <rmin> and <rmax> terms are constants or expressions.
 
 Both the <rmin> and <rmax> terms are optional. Anything omitted will
 not be changed, so 
         set rrange [:10]
 changes rmax to 10 without affecting rmin.
3 samples
 The sampling rate of functions may be changed by the `set samples`
 command. By default, sampling is set to 100 points. A higher sampling
 rate will produce more accurate plots, but will take longer. This
 parameter no longer has any effect on data-file plotting.
 
 Syntax:
         set samples <expression>
         show samples
3 size
 The `set size` command scales the displayed size of the plot.  On some
 terminals, changing the size of the plot will result in text being
 misplaced. Increasing the size of the plot may produce strange
 results. Decreasing is safer.
 
 Syntax:
 
         set size {<xscale>,<yscale>}
         show size
 
 The <xscale> and <yscale> values are the scaling factors for the size.
 The defaults (1,1) are selected if the scaling factors are omitted.
 
 Examples: 
 
 To set the size to normal size use:
         set size
 To make the plot half size use:
         set size 0.5,0.5
 To show the size use:
         show size
 
 For the LaTeX and Fig terminals the default size (scale factor 1,1)
 is 5 inches wide by 3 inches high. The big Fig terminal (`bfig`) is 7
 inches wide by 5 inches high. The postscript default is landscape mode
 10 inches wide and 7 inches high. 
 Note that the size of the plot includes the space used by the labels; 
 the plotting area itself is smaller. 
3 style
 Plots may be displayed in one of six styles: `lines`, `points`,
 `linespoints`, `impulses`, `dots`, or `errorbars`. The `lines` style
 connects adjacent points with lines. The `points` style displays a
 small symbol at each point. The `linespoints` style does both
 `lines` and `points`. The `impulses` style displays a vertical line
 from the x axis to each point. The `dots` style plots a tiny dot at
 each data point; this is useful for scatter plots with many points.
 
 The `errorbars` style is relevant only for to data file `plot`s. It is
 treated like `points` for function `plot`s and `splot`s. For data file
 `plot`s, `errorbars` is like `points`, except that a vertical error
 bar is also drawn: for each point (x,y), a line is drawn from (x,ylow)
 to (x,yhigh). A tic mark is placed at the ends of the error bar. The
 ylow and yhigh values are read from the data file's third and fourth
 columns, or as specified with the `using` option to plot.  See `plot
 errorbars` for more information.
 
 Default styles are chosen with the `set function style` and `set
 data style` commands. See `plot style` for information about how
 to override the default plotting style for individual functions.
 
 Syntax:
         set function style <style>
         set data style <style>
         show function style
         show data style
 
 where <style> is `lines`, `points`, `linespoints`, `impulses`,
 `dots`, or `errorbars`.
3 surface
 `set surface` controls the display of surfaces. It is useful if
 contours are to be displayed by themselves. Whenever `set nosurface`
 is issued, no surface isolines/mesh will be drawn. See also `set
 contour`.
 
 Syntax:
         set surface
         set nosurface
         show surface
3 terminal
 GNUPLOT supports many different graphics devices. Use the `set
 terminal` command to select the type of device for which GNUPLOT
 will produce output.
 
 Syntax:
         set terminal {<terminal-type>}
         show terminal
 
 If <terminal-type> is omitted, GNUPLOT will list the available
 terminal types. <terminal-type> may be abbreviated.
 
 Use `set output` to redirect this output to a file or device.

 Several terminals have additional options. For example, see `dumb`,
 `iris4d`, `hpljii` or `postscript`.
4 dumb
 The dumb terminal driver has an optional size specification.

 Syntax:
         set terminal dumb {<xsize> <ysize>}

 where <xsize> and <ysize> set the size of the dumb terminals. Default
 is 79 by 24.

 Examples:
         set term dumb
         set term dumb 79 49 #(VGA screen - why would anyone want to do that!?)
 
4 hpljii
 The HP LaserJet II and HP DeskJet drivers have a single option.

 Syntax:
         set terminal hpljii {<resolution>}
         set terminal hpdj   {<resolution>}

 where <resolution> is the resolution of the output in dots per inch.
 It must be `75`, `100`, `150` or `300`.

 Example:
         set terminal hpljii 150
 
4 iris4d
 The iris4d driver can operate in two modes.

 Syntax:
         set terminal iris4d {24}

 If the hardware supports only 8 bits, use the default `set terminal
 iris4d`. If, however, the hardware supports 24 bits (8 per
 red/green/blue), use `set terminal iris4d 24`.

 When using 24-bit mode, the colors can be directly specified via the
 file .gnuplot_iris4d that is searched in the current directory and
 then in the home directory specified by the HOME environment variable.
 This file holds RGB values for the background, border, labels and nine
 plotting colors, in that order. For example, here is a file containing
 the default colors:
 
         85   85   85     /* Back Ground */
         0    0    0      /* Boundary */
         170  0    170    /* Labeling */
         85   255  255    /* Plot Color 1 */
         170  0    0      /* Plot Color 2 */
         0    170  0      /* Plot Color 3 */
         255  85   255    /* Plot Color 4 */
         255  255  85     /* Plot Color 5 */
         255  85   85     /* Plot Color 6 */
         85   255  85     /* Plot Color 7 */
         0    170  170    /* Plot Color 8 */
         170  170  0      /* Plot Color 9 */
 
 This file has exactly 12 lines of RGB triples. No empty lines are
 allowed and anything after the third number in line is ignored.
 
4 postscript
 Several options may be set in the PostScript driver.

 Syntax:
         set terminal postscript {<mode>} {<color>}
                                 {"<fontname>"} {<fontsize>}

 where <mode> is `landscape`, `portrait` or `default`. Selecting default
 sets all options to their defaults.
 <color> is either `color` or `monochrome`.
 "<fontname>" is the name of a valid PostScript font.
 <fontsize> is the size of the font in PostScript points, before 
 scaling by the `set size` command.
 Defaults are `landscape`, `monochrome`, "Courier", and 14pt.
 Default size of PostScript plot is landscape mode 10 inches wide 
 and 7 inches high.

 Examples:
 
         set size 1,1
         set term postscript default       # old postscript
         set term postscript landscape 22  # old psbig
         set size 0.5,0.5
         set term postscript portrait 14   # old epsf1
         set term postscript portrait 22   # old epsf2
         set size 1,1; set term post landscape color "Times-Roman" 14 
 
3 tics
 By default, tics are drawn inwards from the border on all four sides.
 The `set tics` command can be used to change the tics to be 
 drawn outwards on the left and bottom borders only.
 This is useful when doing impulse plots.
 
 Syntax:
         set tics {<direction>}
         show tics
 
 where <direction> may be `in` or `out`. `set tics` defaults to `in`.
 
 See also the `set xtics`, `set ytics`, and `set ztics` command for more
 control of tic marks.
 Using splot, in 3-d plots, one can adjust the relative height of the
 vertical (Z) axis using `set ticslevel`. The numeric argument provided
 specifies the location of the bottom of the scale. a zero will put it
 on the bottom grid and any positive number somewhere along the z axis.
 
 Syntax:
         set ticslevel {<level>}
         show tics
 
 where <level> is a non negative numeric argument. For example,

         set ticslevel 0.5

 sets the tics level to the default value.
 
 See also the `set view`.
3 time
 The optional `set time` places the time and date of the plot either
 at the top or bottom of the left margin. The exact location is
 device dependent.
 
 Syntax:
         set time {<xoff>}{,<yoff>}
         set notime
         show time
 
 Specifying constants <xoff> or <yoff> as optional offsets for the time
 will move the time <xoff> or <yoff> character screen coordinates. For
 example,
 
         set time ,-3
 
 will change only the y offset of the time, moving the title down by
 roughly the height of three characters.
 
3 title
 The `set title` command produces a plot title that is centered at the
 top of the plot. Using the optional x,y screen offsets, the title
 can be placed anywhere on the plot. `set title` with no parameters
 clears the title.
 
 Syntax:
          set title {"<title-text>"} {<xoff>}{,<yoff>}
          show title
 
 Specifying constants <xoff> or <yoff> as optional offsets for the
 title will move the title <xoff> or <yoff> character screen
 coordinates. Note these are screen coordinates and not plot
 coordinates. For example,
 
          set title ,-1
 
 will change only the y offset of the title, moving the title down by
 roughly the height of one character.
 
 (The Latex, EEPIC, and Imagen drivers allow \\ in a string to specify
 a newline.)
3 trange
 The `set trange` command sets the parametric range used to compute
 x and y values when in parametric mode. If not in parametric mode
 (see `set parametric`) then this range is not used. This command
 does not affect x/y autoscaling or x/y ranges.
 
 This range may also be specified on the `plot` command line when
 in parametric mode.
 
 Syntax:
         set trange [{<tmin> : <tmax>}]
 
 where <tmin> and <tmax> terms are constants or expressions.
 
 Both the <tmin> and <tmax> terms are optional. Anything omitted will
 not be changed, so 
         set trange [:10]
 changes tmax to 10 without affecting tmin.  See also `set urange` and
 `set parametric`.
3 urange
 The `set urange` and `set vrange` commands sets the parametric ranges used 
 to compute x, y, and z values when in `splot` parametric mode. If not in 
 parametric mode (see `set parametric`) then these ranges are not used. This 
 command does not affect x/y autoscaling or x/y ranges.
 
 This range may also be specified on the `splot` command line when
 in parametric mode.  See `plot` for more information
 
 Syntax:
         set urange [{<umin> : <umax>}]
 
 where <umin> and <umax> terms are constants or expressions.
 
 Both the <umin> and <umax> terms are optional. Anything omitted will
 not be changed, so 
         set urange [:10]
 changes umax to 10 without affecting umin.  See also `set trange`.
3 variables
 The `show variables` command lists all user-defined variables and
 their values.
 
 Syntax:
         show variables
3 view
 The `set view` command sets the view point for `splot`s. This
 command controls the way the 3-d coordinates of the plot are mapped
 into the 2-d screen space. This command provides controls to both
 rotation and scaling of the plotted data but supports orthographic
 projections only.
 
 Syntax:
         set view <rot_x> {,{<rot_z>}{,{<scale>}{,<scale_z>}}}
         show view
 
 where <rot_x> and <rot_z> control the rotation angles (in degrees)
 along a virtual 3-d coordinate system aligned with the screen such
 that the screen horizontal axis is x, screen vertical axis is y, and
 the axis perpendicular to the screen is z. <rot_x> is bounded to the
 [0:180] range with a default of 60 degrees, while <rot_z> is bounded
 to the [0:360] range with a default of 30 degrees. <scale> controls
 the scaling of the entire `splot`, while <scale_z> scales the z axis
 only. Both scales default to 1.0.
 
 Examples:
         set view 60, 30, 1, 1
         set view ,,0.5
 
 The first sets all the four default values. The second changes 
 only scale, to 0.5.

 See also `set ticslevel`.
3 vrange
 The `set vrange` command is similar to the `set urange` command.
 Please see `set urange`.
3 xlabel
 The `set xlabel` command sets the x-axis label that is centered along
 the x axis. Using the optional x,y screen offsets, the label can be
 placed anywhere on the plot. `set xlabel` with no parameters clears
 the label.
 
 Syntax: 
          set xlabel {"<label>"} {<xoff>}{,<yoff>}
          show xlabel
 
 Specifying constants <xoff> or <yoff> as optional offsets for the
 label will move the label <xoff> or <yoff> character screen
 coordinates. For example,
 
          set xlabel -1
 
 will change only the x offset of the xlabel, moving the label roughly
 one character width to the left.
 
 (The LaTeX, EEPIC, and Imagen drivers allow \\ in a string to specify
 a newline.)
3 xrange
 The `set xrange` command sets the horizontal range that will be
 displayed. This command turns x axis autoscaling off.
 
 This range may also be specified on the `plot` command line.
 
 Syntax:
         set xrange [{<xmin> : <xmax>}]
 
 where <xmin> and <xmax> terms are constants or expressions.
 
 Both the <xmin> and <xmax> terms are optional. Anything omitted will
 not be changed, so 
         set xrange [:10]
 changes xmax to 10 without affecting xmin.
3 xtics
 Fine control of the x axis tic marks is possible with the
 `set xtics` command. The x-axis tic marks may be turned off with the
 `set noxtics` command. They may be turned on (the default state) with
 `set xtics`.
 
 Syntax:
          set xtics { {<start>, <incr>{, <end>}} |
                      {({"<label>"} <pos> {, {"<label>"} <pos>}...)} }
          set noxtics
          show xtics

 The <start>, <incr>, <end> form specifies that a series of tics will
 be plotted on the x axis between the x values <start> and <end>
 with an increment of <incr>. If <end> is not given it is assumed to be
 infinity. The increment may be negative. For example,
           set xtics 0,.5,10
 makes tics at 0, 0.5, 1, 1.5, ..., 9.5, 10.
 
 The ("<label>" <pos>, ...) form allows arbitrary tic positions or
 non-numeric tic labels. A set of tics are a set of positions, each
 with its own optional label. Note that the label is a string enclosed
 by quotes, and may be a constant string, such as "hello", or contain
 formatting information for the tic number (which is the same as the
 position), such as "%3f clients". See `set format` for more
 information about this case. The label may even be empty.
 Examples:
          set xtics ("low" 0, "medium" 50, "high" 100)
          set xtics (1,2,4,8,16,32,64,128,256,512,1024)
          set xtics ("bottom" 0, "" 10, "top" 20)
 
 Tics will only be plotted when in range.
 
 The `set ytics` and `set noytics` commands work identically.
 See also the `set format` command.
3 xzeroaxis
 `set xzeroaxis` draws the x-axis. By default, this option is on.
 `set noxzeroaxis` causes GNUPLOT to omit the x-axis.
 
 Syntax:
         set xzeroaxis
         set noxzeroaxis
         show xzeroaxis
3 ylabel
 The `set ylabel` command sets the y-axis label.  The position of this
 label depends on the terminal, and can be one of the following three
 positions (the position can be adjusted with optional parameters).
 
 1. Horizontal text flushed left at the top left of the plot.
 Terminals that cannot rotate text will probably use this method.
 
 2. Vertical text centered vertically at the left of the plot.
 Terminals that can rotate text will probably use this method.
 
 3. Horizontal text centered vertically at the left of the plot.
 The LaTeX and EEPIC drivers use this method. The user must insert 
 line breaks using \\ to prevent the ylabel from overwriting
 the plot. To produce a vertical row of characters, add \\
 between every printing character (but this is ugly).
 
 Syntax:  
          set ylabel {"<label>"} {<xoff>}{,<yoff>}
          show ylabel
 
 With no parameters, the label is cleared. Specifying constants <xoff>
 or <yoff> as optional offsets for the label will move the label <xoff>
 or <yoff> character screen coordinates. For example,
 
          set ylabel -1
 
 will change only the x offset of the ylabel, moving the label roughly
 one character width left of its default position. This is especially
 useful with the LaTeX driver.
 
 (The LaTeX, EEPIC, and Imagen drivers allow \\ in a string to specify
 a newline.)
3 yrange
 The `set yrange` command sets the vertical range that will be
 displayed. This command turns y axis autoscaling off.
 
 This range may also be specified on the `plot` command line.
 
 Syntax:
         set yrange [{<ymin> : <ymax>}]
 
 where <ymin> and <ymax> terms are constants or expressions.
 
 Both the <ymin> and <ymax> terms are optional. Anything omitted will
 not be changed, so 
         set yrange [:10]
 changes ymax to 10 without affecting ymin.
3 ytics
 The `set ytics` and `set noytics` commands are similar to the `set xtics`
 and `set noxtics` commands. Please see `set xtics`.
3 yzeroaxis
 `set yzeroaxis` draws the y-axis. By default, this option is on.
 `set noyzeroaxis` causes GNUPLOT to omit the y-axis.
 
 Syntax:
         set yzeroaxis
         set noyzeroaxis
         show yzeroaxis
3 zero
 The `zero` value is the default threshold for values approaching 0.0.
 GNUPLOT will not plot a point if its imaginary part is greater in
 magnitude than the `zero` threshold. Axis ranges cannot be less than
 `zero`. The default `zero` value is 1e-8. This can be changed with
 the `set zero` command.

 Syntax:
         set zero <expression>
         show zero
3 zeroaxis
 `set zeroaxis` draws the x-axis and y-axis. By default, this option is
 on.  `set nozeroaxis` causes GNUPLOT to omit the axes, and is
 equivalent to `set noxzeroaxis; set noyzeroaxis.`
 
 Syntax:
         set zeroaxis
         set nozeroaxis
         show zeroaxis
 See `set xzeroaxis` and `set yzeroaxis`.
3 zlabel
 The `set zlabel` command sets the z-axis label that is centered along
 the z axis. Using the optional x,y screen offsets, the label can be
 placed anywhere on the plot. `set zlabel` with no parameters clears
 the label.
 
 Syntax: 
          set zlabel {"<label>"} {<xoff>}{,<yoff>}
          show zlabel
 
 Specifying constants <xoff> or <yoff> as optional offsets for the
 label will move the label <xoff> or <yoff> character screen
 coordinates. For example,
 
          set zlabel ,1
 
 will change only the y offset of the zlabel, moving the label roughly
 one character height up.
 
 The zlabel will be drawn whenever surfaces or contours are plotted,
 in the space above the grid level.
 
 (The LaTeX, EEPIC, and Imagen drivers allow \\ in a string to specify
 a newline.)
3 zrange
 The `set zrange` command sets the vertical range that will be
 displayed. This command turns z axis autoscaling off.  The zrange is
 used only by `splot` and is ignored by `plot`.
 
 This range may also be specified on the `splot` command line.
 
 Syntax:
         set zrange [{<zmin> : <zmax>}]
 
 where <zmin> and <zmax> terms are constants or expressions.
 
 Both the <zmin> and <zmax> terms are optional. Anything omitted will
 not be changed, so
         set zrange [2:]
 changes zmin to 2 without affecting zmax.
3 ztics
 The `set ztics` and `set noztics` commands are similar to the `set
 xtics` and `set noxtics` commands. Please see `set xtics`.
2 shell
 The `shell` command spawns an interactive shell. To return to
 GNUPLOT, type `logout` if using VMS, `exit` or the END-OF-FILE
 character if using Unix, `endcli` if using AmigaDOS, or `exit` if
 using MS-DOS.
 
 A single shell command may be spawned by preceding it with the !
 character ($ if using VMS) at the beginning of a command line.
 Control will return immediately to GNUPLOT after this command is
 executed. For example, in VMS, AmigaDOS, or MS-DOS,
 
      ! dir
 
 prints a directory listing and then returns to GNUPLOT.
2 splot
 Three-dimensional surface and contour plotting is available in
 GNUPLOT with the `splot` command. See the `plot` command for features
 common to the `plot` command.
 
 See also `set contour`, `set cntrparam`, and `set surface`.
2 start-up
 When GNUPLOT is run, it looks for an initialization file to load.
 This file is called `.gnuplot` on Unix and AmigaDOS systems, and
 `GNUPLOT.INI` on other systems. If this file is not found in the
 current directory, the program will look for it in the home directory
 (under AmigaDOS and MS-DOS, the environment variable GNUPLOT should
 contain the name of this directory).
 
 If this file is found, GNUPLOT executes the commands in this file.
 This is most useful for setting the terminal type and defining any
 functions or variables that are used often.
2 substitution
 Command-line substitution is specified by a system command enclosed in
 backquotes. This command is spawned and the output it produces
 replaces the name of the command (and backquotes) on the command line.
 
 Newlines in the output produced by the spawned command are replaced
 with blanks.
 
 Command-line substitution can be used anywhere on the GNUPLOT command
 line.
 
 Example:
 
 This will run the program `leastsq` and replace `leastsq` (including
 backquotes) on the command line with its output:
 
          f(x) = `leastsq`
 
 or, in VMS
 
          f(x) = `run leastsq`
2 user-defined
 New user-defined variables and functions of one or two variables may be 
 declared and used anywhere.
 
 User-defined function syntax:
         <function-name> ( <dummy-var1> {,<dummy-var2>} ) =  <expression>
 
 where <expression> is defined in terms of <dummy-var1> and <dummy-var2>.

 User-defined variable syntax:
         <variable-name> = <constant-expression>
 
 Examples:
         w = 2
         q = floor(tan(pi/2 - 0.1))
         f(x) = sin(w*x)
         sinc(x) = sin(pi*x)/(pi*x)
         delta(t) = (t == 0)
         ramp(t) = (t > 0) ? t : 0
         min(a,b) = (a < b) ? a : b
         comb(n,k) = n!/(k!*(n-k)!)
 
 Note that the variable `pi` is already defined.
 
 See `show functions` and `show variables`.
2 bugs
 The atan() function does not work correctly for complex arguments.
 
 The bessel functions do not work for complex arguments.
 
 The gamma function does not work for complex arguments.
 
 There is a bug in the stdio library for old Sun operating systems
 (SunOS Sys4-3.2). The "%g" format for 'printf' sometimes incorrectly
 prints numbers (e.g., 200000.0 as "2"). Thus, tic mark labels may be
 incorrect on a Sun4 version of GNUPLOT. A work-around is to rescale
 the data or use the `set format` command to change the tic mark format
 to "%7.0f" or some other appropriate format. This appears to have been
 fixed in SunOS 4.0.
 
 Another bug: On a Sun3 under SunOS 4.0, and on Sun4's under Sys4-3.2
 and SunOS 4.0, the 'sscanf' routine incorrectly parses "00 12" with
 the format "%f %f" and reads 0 and 0 instead of 0 and 12. This
 affects data input. If the data file contains x coordinates that are
 zero but are specified like '00', '000', etc, then you will read the
 wrong y values. Check any data files or upgrade the SunOS.
 It appears to have been fixed in SunOS 4.1.1.
 
 Microsoft C 5.1 has a nasty bug associated with the %g format for
 printf. When any of the formats "%.2g", "%.1g", "%.0g", "%.g" are
 used, printf will incorrectly print numbers in the range 1e-4 to 1e-1.
 Numbers that should be printed in the %e format are incorrectly 
 printed in the %f format, with the wrong number of zeros after the 
 decimal point.

 To work around this problem, use the %e or %f formats explicitly.
 
 GNUPLOT, when compiled with Microsoft C, did not work correctly on two
 VGA displays that were tested. The CGA, EGA and VGA drivers should 
 probably be rewritten to use the Microsoft C graphics library.
 GNUPLOT compiled with Turbo C uses the Turbo C graphics drivers and 
 does work correctly with VGA displays.
 
 VAX/VMS 4.7 C compiler release 2.4 also has a poorly implemented %g 
 format for printf. The numbers are printed numerically correct, but 
 may not be in the requested format. The K&R second edition says that 
 for the %g format, %e is used if the exponent is less than -4 or greater 
 than or equal to the precision. The VAX uses %e format if the exponent 
 is less than -1. The VAX appears to take no notice of the precision 
 when deciding whether to use %e or %f for numbers less than 1.
 To work around this problem, use the %e or %f formats explicitly.
 From the VAX C 2.4 release notes:
 e,E,f,F,g,G  Result will always contain a decimal  point.
 For g and G, trailing zeros will not be removed from the result.
 
 VAX/VMS 5.2 C compiler release 3.0 has a slightly better implemented
 %g format than release 2.4, but not much. Trailing decimal points are 
 now removed, but trailing zeros are still not removed from %g numbers 
 in exponential format.

 ULTRIX X11R3 has a bug that causes the X11 driver to display "every
 other" plot.  The bug seems to be fixed in DEC's release of X11R4 so
 newer releases of ULTRIX don't seem to have the problem.  Solutions for 
 older sites include upgrading the X11 libraries (from DEC or direct from 
 MIT) or defining ULTRIX_KLUDGE when compiling the x11.trm file.  Note 
 that the kludge is not an ideal fix, however.

 The constant HUGE was incorrectly defined in the NeXT OS 2.0 operating
 system.  HUGE should be set to 1e38 in plot.h. This error has been
 corrected in the 2.1 version of NeXT OS.

 Please report any bugs to pixar!bug-gnuplot@sun.com or
 pixar!bug-gnuplot@ucbvax.berkeley.edu.
